"use client";
import dynamic from "next/dynamic";
const Chart = dynamic(() => import("react-apexcharts"), { ssr: false });
import { colors } from "@/lib/colors";
import { useTheme } from "next-themes";
import { hexToRGB } from "@/lib/utils";
import { useConfig } from "@/hooks/use-config";
import { getGridConfig, getLabel } from "@/lib/appex-chart-options";

const BasicScatter = ({ height = 300 }) => {
  const [config] = useConfig();
  const { theme: mode } = useTheme();


  const series = [
    {
      name: "SAMPLE A",
      data: [
        [16.4, 5.4],
        [21.7, 2],
        [25.4, 3],
        [19, 2],
        [10.9, 1],
        [13.6, 3.2],
        [10.9, 7.4],
        [10.9, 0],
        [10.9, 8.2],
        [16.4, 0],
        [16.4, 1.8],
        [13.6, 0.3],
        [13.6, 0],
        [29.9, 0],
        [27.1, 2.3],
        [16.4, 0],
        [13.6, 3.7],
        [10.9, 5.2],
        [16.4, 6.5],
        [10.9, 0],
        [24.5, 7.1],
        [10.9, 0],
        [8.1, 4.7],
        [19, 0],
        [21.7, 1.8],
        [27.1, 0],
        [24.5, 0],
        [27.1, 0],
        [29.9, 1.5],
        [27.1, 0.8],
        [22.1, 2],
      ],
    },
    {
      name: "SAMPLE B",
      data: [
        [36.4, 13.4],
        [1.7, 11],
        [5.4, 8],
        [9, 17],
        [1.9, 4],
        [3.6, 12.2],
        [1.9, 14.4],
        [1.9, 9],
        [1.9, 13.2],
        [1.4, 7],
        [6.4, 8.8],
        [3.6, 4.3],
        [1.6, 10],
        [9.9, 2],
        [7.1, 15],
        [1.4, 0],
        [3.6, 13.7],
        [1.9, 15.2],
        [6.4, 16.5],
        [0.9, 10],
        [4.5, 17.1],
        [10.9, 10],
        [0.1, 14.7],
        [9, 10],
        [12.7, 11.8],
        [2.1, 10],
        [2.5, 10],
        [27.1, 10],
        [2.9, 11.5],
        [7.1, 10.8],
        [2.1, 12],
      ],
    },
    {
      name: "SAMPLE C",
      data: [
        [21.7, 3],
        [23.6, 3.5],
        [24.6, 3],
        [29.9, 3],
        [21.7, 20],
        [23, 2],
        [10.9, 3],
        [28, 4],
        [27.1, 0.3],
        [16.4, 4],
        [13.6, 0],
        [19, 5],
        [22.4, 3],
        [24.5, 3],
        [32.6, 3],
        [27.1, 4],
        [29.6, 6],
        [31.6, 8],
        [21.6, 5],
        [20.9, 4],
        [22.4, 0],
        [32.6, 10.3],
        [29.7, 20.8],
        [24.5, 0.8],
        [21.4, 0],
        [21.7, 6.9],
        [28.6, 7.7],
        [15.4, 0],
        [18.1, 0],
        [33.4, 0],
        [16.4, 0],
      ],
    },
  ];
  const options: any = {
    chart: {
      toolbar: {
        show: false,
      },
      zoom: {
        enabled: true,
        type: "xy",
      },
    },
    dataLabels: {
      enabled: false,
    },
    stroke: {
      curve: "smooth",
      width: 4,
    },
    colors: [
      colors.primary,
      colors.info,
      colors.primary
    ],
    tooltip: {
      theme: mode === "dark" ? "dark" : "light",
    },
    grid: getGridConfig(),


    fill: {
      opacity: 1,
    },

    yaxis: {
      axisBorder: {
        show: false,
      },
      axisTicks: {
        show: false,
      },
      labels: getLabel(mode === 'light' ? colors["default-600"] : colors["default-300"]),
    },

    xaxis: {
      axisBorder: {
        show: false,
      },
      axisTicks: {
        show: false,
      },
      labels: getLabel(mode === 'light' ? colors["default-600"] : colors["default-300"]),
    },
    legend: {
      labels: {
        colors: mode === 'light' ? colors["default-600"] : colors["default-300"],
      },
      itemMargin: {
        horizontal: 5,
        vertical: 5,
      },
      markers: {
        width: 10,
        height: 10,
        radius: 10,
        offsetX: config.isRtl ? 5 : -5
      }
    },
    padding: {
      top: 0,
      right: 0,
      bottom: 0,
      left: 0,
    },
  };
  return (
    <Chart
      options={options}
      series={series}
      type="scatter"
      height={height}
      width={"100%"}
    />
  );
};

export default BasicScatter;
